-10 -5 0 5

[Degrees]

S/C-3, ILAT=[69.5312, 71.2181], R=[4.2906, 4.3891], filter=0.7

Angle between spin plane and B-field

-20

0

20

Eperp1 [mV/m]

EFW EDI CIS

-2000

0

2000

Eperp2 [mV/m]

EFW if E_{para} = 0 EDI CIS

30 40 50 60 70

Epara [mV/m]

EFW if E_z = 0 EDI if E_{perp2} = 0 CIS if E_{perp2} = 0

-15 -10 -5 0

[Volts]

S/C potential

07:1507:1607:1707:1807:1907:2007:2107:2207:2307:2407:25 16

17

18

12-Mar-2001

Angle between Sun and B-field