-5

0

5

[Degrees]

S/C-3, ILAT=[66.388, 66.454], R=[4.6783, 4.6822], filter=0, ZOOMED

Angle between spin plane and B-field

EFW EDI CIS

EFW if E_{para} = 0 EDI CIS

EFW if E_z = 0 EDI if E_{perp2} = 0 CIS if E_{perp2} = 0

-30 -20 -10 0

[Volts]

S/C potential

14:28:0014:28:0514:28:1014:28:1514:28:2014:28:2514:28:30 -2 0 2 4

06-Mar-2002

Angle between Sun and B-field

-5

0

5

Epara [mV/m]

-50

0

50

Eperp2 [mV/m]

-50

0

50

Eperp1 [mV/m]