amplitude V

-14 -12 -10 -8 -6 -4

Start: 2002-02-17 22:47:00.0

22:47 22:48 22:49 22:50 22:51 22:52 22:53 22:54 22:55 22:56 22:57 UT Interval: 600.0s

Cluster 3 efw E p1 10Hz any [-14.1619,-3.94893 V] SC

Cluster 3 whisper natural

Start: 2002-02-17 22:47:00.0 Interval: 600.0s UT

22:47 22:48 22:49 22:50 22:51 22:52 22:53 22:54 22:55 22:56

frequency[Hz]

1E+04

2E+04

3E+04

4E+04

5E+04

6E+04

7E+04

8E+04 energy [(V/m)^2/Hz]

1E-17

1E-16

1E-15

1E-14

1E-13

1E-12

1E-11

Cluster 3 staff E_SA a_E 8-4096Hz

Start: 2002-02-17 22:47:00.0 Interval: 600.0s UT

22:47 22:48 22:49 22:50 22:51 22:52 22:53 22:54 22:55 22:56

frequency[Hz]

10

31.62

100

316.2

1000

3162 power [(mV/m)^2/Hz]

1 316.2

0.0032

1E-05

3.2E-08

ISDAT igr 3.3 <whisper_on_sc3.igr> erik@anna 2002-10-29 08:33:12.0 File: staff_whisper_SC3.ps q0 = Cluster 3 efw E p1 10Hz any (2.8.2.2.2) q4 = Cluster 3 whisper natural (2.8.2.1.1) q8 = Cluster 3 staff E_SA a_E 8-4096Hz (2.8.2.0.0)