0 45 90 135 180 225 270 315 360 -6 -4 -2 0 2 4 6 mV/m phase vs E_{para} on S/C-2

0 45 90 135 180 225 270 315 -6 -4 -2 0 2 4 6 Angle between B-field and spinning x-axis vs E_{para} on S/C-2

-10 -5 0 5 10

Volts

S/C-2, raw probe data E_{12}

01:10:15 01:10:20 01:10:25 01:10:30 01:10:35 -10 -5 0 5 10

06-Feb-2002

E_{34}