-2.5

-2

-1.5

Degrees

S/C-3, ILAT=[-65.716, -65.566], R=[4.6138, 4.6056], filter=0, ZOOMED Angle between spin plane and B-field

-20

0

20 mV/m

E_{perp1} EDI CIS

-20

0

20 E_{perp2} if E_{para} = 0 EDI CIS

-2 0 2 E_{para} if E_z = 0

-15 -10 -5 0

Volts

SC_{pot}

21:00:00 21:00:20 21:00:40 21:01:00 -11 -10 -9 -8

17-Feb-2002

Angle between Sun and B-field